UPDATE `hilis4`.`referral_sources` SET `display_name`='Macclesfield District General Hospital' WHERE `display_name`='Macclesfield'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Southend Hospital' WHERE `display_name`='Southend'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Frimley Park Hospital' WHERE `display_name`='Frimley Park'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Southport General Infirmary' WHERE `display_name`='Southport'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Worthing Hospital' WHERE `display_name`='Worthing'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Seacroft Hospital' WHERE `display_name`='Seacroft'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Kings Mill Hospital' WHERE `display_name`='Kings Mill'
UPDATE `hilis4`.`referral_sources` SET `display_name`='Scarborough General' WHERE `display_name`='Scarborough'
