/* RfC 563 & 564 */
INSERT INTO `outreach`.`lab_params` (`param_name`, `field_label`, `field_type`, `department_id`) VALUES 
	('sp_haemoph', 'Haemoph', 'decimal', 1),
	('sp_pneumoc', 'Pneumoc', 'decimal', 1),
	('sp_tetanus', 'Tetanus', 'decimal', 1),
	('sflc_kappa', 'Free kappa LC', 'decimal', 1),
	('sflc_lambda', 'Free lambda LC', 'decimal', 1),
	('sflc_ratio', 'sFLC Ratio', 'decimal', 1);
	
INSERT INTO `outreach`.`defaults_and_ranges` (`param_id`, `lower_limit`, `upper_limit`, `default`, `units`) VALUES 
	(34, '6.7', '22.4', '999.0', 'mg/L'),
	(35, '8.3', '27.0', '999.0', 'mg/L'),
	(36, '0.31', '1.56', '99.0', NULL);
